/*
 Navicat Premium Data Transfer

 Source Server         : rm-wz92918pm46bsbc37mo.mysql.rds.aliyuncs.com
 Source Server Type    : MySQL
 Source Server Version : 50732
 Source Host           : rm-wz92918pm46bsbc37mo.mysql.rds.aliyuncs.com:3306
 Source Schema         : coreshop

 Target Server Type    : MySQL
 Target Server Version : 50732
 File Encoding         : 65001

 Date: 01/07/2022 19:44:10
*/

SET NAMES utf8mb4;
SET FOREIGN_KEY_CHECKS = 0;

-- ----------------------------
-- Table structure for CoreCmsCheckBeforeAddOrder
-- ----------------------------
DROP TABLE IF EXISTS `CoreCmsCheckBeforeAddOrder`;
CREATE TABLE `CoreCmsCheckBeforeAddOrder`  (
  `id` int(11) NOT NULL AUTO_INCREMENT COMMENT '序列',
  `orderId` varchar(50) CHARACTER SET utf8 COLLATE utf8_general_ci NOT NULL COMMENT '订单编号',
  `requireOrder` int(11) NOT NULL COMMENT '是否需要推单',
  `requiredFundType` int(11) NOT NULL COMMENT '商户订单类型',
  `traceId` varchar(50) CHARACTER SET utf8 COLLATE utf8_general_ci NULL DEFAULT NULL COMMENT '跟踪ID',
  `createTime` datetime(0) NOT NULL COMMENT '创建时间',
  PRIMARY KEY (`id`) USING BTREE
) ENGINE = InnoDB AUTO_INCREMENT = 1 CHARACTER SET = utf8 COLLATE = utf8_general_ci COMMENT = '微信交易组件下单前置检查' ROW_FORMAT = Dynamic;

SET FOREIGN_KEY_CHECKS = 1;
