INSERT INTO `SysMenu` VALUES (1388, 43, 'appupdatelog', '安卓苹果更新日志', NULL, 'system/appupdatelog/index', NULL, 0, 10, NULL, NULL, NULL, 0, 0, '2022-07-20 01:19:33', NULL);