
/****** Object:  Table [dbo].[CoreCmsAppUpdateLog]    Script Date: 2022/7/20 1:02:59 ******/
SET ANSI_NULLS ON
GO

SET QUOTED_IDENTIFIER ON
GO

CREATE TABLE [dbo].[CoreCmsAppUpdateLog](
	[id] [INT] IDENTITY(1,1) NOT NULL,
	[version] [INT] NOT NULL,
	[note] [NVARCHAR](255) NOT NULL,
	[android] [NVARCHAR](255) NULL,
	[ios] [NVARCHAR](255) NULL,
	[addTime] [DATETIME] NOT NULL,
	[isUpdate] [BIT] NOT NULL,
 CONSTRAINT [PK_CoreCmsAppUpdateLog] PRIMARY KEY CLUSTERED 
(
	[id] ASC
)WITH (PAD_INDEX = OFF, STATISTICS_NORECOMPUTE = OFF, IGNORE_DUP_KEY = OFF, ALLOW_ROW_LOCKS = ON, ALLOW_PAGE_LOCKS = ON) ON [PRIMARY]
) ON [PRIMARY]
GO

ALTER TABLE [dbo].[CoreCmsAppUpdateLog] ADD  CONSTRAINT [DF_CoreCmsAppUpdateLog_addTime]  DEFAULT (GETDATE()) FOR [addTime]
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'ÐòÁÐ' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'id'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'°æ±¾ºÅ' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'version'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'¸üÐÂÄÚÈÝ' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'note'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'°²×¿µØÖ·' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'android'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'IOSµØÖ·' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'ios'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'´´½¨Ê±¼ä' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'addTime'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'¿ªÆô¸üÐÂ' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog', @level2type=N'COLUMN',@level2name=N'isUpdate'
GO

EXEC sys.sp_addextendedproperty @name=N'MS_Description', @value=N'°æ±¾¸üÐÂ±í' , @level0type=N'SCHEMA',@level0name=N'dbo', @level1type=N'TABLE',@level1name=N'CoreCmsAppUpdateLog'
GO


